› Öïôå­Ðïìì ››Example usage:››Vote-Poll›Vote-Poll [section name]›› Each section can have up to 26 different poll questions.  When the vote-poll command is entered, the questions will be displayed sequentially.  After the question (and the number of times the votepoll has been taken) is displayed, the prompt ÛÖÝote ÛÓÝkip ÛÒÝesults ÛÑÝuit:  is displayed.  Vote will allow you to vote on the above poll question.  After voting, you will then be shown the results of the poll.  You can only vote once per poll question.  Skip will skip on to the next question (if there is a question following this one).  Results will show you the results of this poll so far.  If you want to see the results of a poll before voting on it, you will not be allowed to vote (because your opinion is no longer unbiased (not that it was before)).››